\documentclass[11pt]{article}

\usepackage{a4wide}

\begin{document}

\title{Template for ALCOM-FT Technical Reports%
  \thanks{This work was partially supported by the
    IST Programme of the EU under contract number
    IST-1999-14186 (ALCOM-FT).}}

\author{Erik Meineche Schmidt \\[1ex]
    BRICS \\
    Department of Computer Science,
    University of Aarhus,
    Denmark
  \and 
    Rolf Fagerberg \\[1ex]
    BRICS \\
    Department of Computer Science,
    University of Aarhus, 
    Denmark}

\maketitle

\begin{abstract}
  This is a template for generating ALCOM-FT technical reports.  It is
  optional to use this template, but the submitted reports should
  preferably be formatted for \textbf{A4} paper,
  \textbf{single-column}, and using a font size of \textbf{11pt}. It
  is crucial that all submitted reports contain a \textbf{reference to
    ALCOM-FT} as in the footnote below.  On the first page of the
  submitted postscript file will be inserted the assigned ALCOM-FT
  technical report number and ALCOM-FT logo. It is therefore important
  that the topmost 25~mm of the front page are left blank.
\end{abstract}

\section{Introduction}

Here goes the body of the paper...

\end{document}
