Template for ALCOM-FT Technical Reports^∗

Erik Meineche Schmidt BRICS Department of Computer Science, University of Aarhus, Denmark

Rolf Fagerberg BRICS Department of Computer Science, University of Aarhus, Denmark

January 8, 2001

Abstract

This is a template for generating ALCOM-FT technical reports. It is optional to use this template, but the submitted reports should preferably be formatted for A4 paper, single-column, and using a font size of 11pt. It is crucial that all submitted reports contain a reference to ALCOM-FT as in the footnote below. On the first page of the submitted postscript file will be inserted the assigned ALCOM-FT technical report number and ALCOM-FT logo. It is therefore important that the topmost 25 mm of the front page are left blank.

1 Introduction

Here goes the body of the paper...

∗This work was partially supported by the IST Programme of the EU under contract number IST-1999- 14186 (ALCOM-FT).